0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

10^{-5} 10^{-4} 10^{-3} 10^{-2} 10^{-1}

F^{em}_2

X

H1, ZEUS 1996/97 NMC, BCDMS, E665 NLO QCD Fit Regge Fit (ZEUS)